en	[[!meta title="Critical security vulnerability in Tails 3.14.1"]]

en	[[!tag security/fixed]]

en	Tor Browser in Tails 3.14.1 and earlier is unsafe to use in most cases.

en	We strongly encourage you to [[upgrade to Tails 3.14.2|news/version_3.14.2]] as soon as possible.

en	[[!inline pages="news/version_3.14.1/sandbox_escape.inline" raw="yes" sort="age"]]